Intensive Service or Industrial

E-A, R-A, CON, R-1, R-21, R-10, MAZ Residential 40 feet* Multi-family, Commercial or Mixed-use areas

E-A, R-A, CON, R-1, R-21, R-10, MAZ Residential

30 feet*

Office or Institutional

E-A, R-A, CON, R-1, R-21, R-10, MAZ Residential 20 feet* * The installation of a 6’ to 8’ opaque fence enables the buffer area to be decreased by 50% and the buffer landscaping requirement to be decreased by 25%. For example, with the installation of an 8’ fence a 30’ buffer area with 4 shade trees and 25 shrubs per 100 linear feet can be reduced to 15 feet with 3 shade trees and 19 shrubs per 100 linear feet.